Copyright: Copyright © 1998 Mark Russinovich


NTHandle Help

DLLView for Windows 95

Copyright  1998 Mark Russinovich

http://www.sysinternals.com

Introduction

DllView is a Win32 program that shows you which DLLs processes have opened or loaded. Its display consists of two sub-windows. The top shows a list of the currently active processes, whereas the information displayed in bottom is the DLLs that the process has loaded.  DLLView also has a powerful search capability that will quickly show you which processes have particular DLLs loaded.

The unique capabilities of DLLView make it useful for tracking down DLL-version.

You can obtain an equivalent tool for Windows NT, HandleEx, at the Systems Internals Web site (http://www.sysinternals.com).

DLLView  has been tested on Windows 95.

Refresh

The F5 key or the “Refresh” menu item will cause DLLView  to rescan process and DLL information.

Searching

You can search for processes that have particular DLLs loaded. The search dialog is activated with the search toolbar button or its menu item. Enter a substring in the edit box of the search dialog and select the “Search” button. DLLView will search for loaded DLLs that have the substring in their path name. All DLLs are scanned, not just those of the currently selected process.

Reporting Bugs and Feedback

If you encounter a problem while running DLLView, please visit http://www.sysinternals.com to obtain the latest version. If you still have problems, please record all the information relevant to the problem. Determine if the problem is reproducible, and if so, how, and send this information to:

mark@sysinternals.com