Copyright: Copyright (c) 1999 by Idyle Software. All rights reserved.


CPU Load by Idyle Software

CPU Load v2.00

by Idyle Software

http://www.idyle.com

What is CPU Load?

  CPU Load is a 32-bit software for Windows 95 and 98 that monitors the CPU Load (or Usage). Display includes a CPU Indicator, a CPU Usage History and a system tray icon as a CPU meter.

Freeware

  CPU Load is freeware. This means there is no license fee to pay in order to use this program.

More Information

  Please take the time to visit our web site to try our other products. It is simple, open your internet browser and go to: http://www.idyle.com

  Make sure to subscribe to Idyle Software's special offers bulletin in order to be notified of special offers and new products releases.

Technical Support

  Since CPU Load is freeware, no technical support will be offered for this program. Please visit our web site to browse the documentation for CPU Load, or read the help file.

Uninstall

  To uninstall CPU Load, please use the built-in uninstaller program by following these steps:

1. Open the Control Panel (Start, Settings, Control Panel)

2. Double click Add/Remove Programs

3. Select "CPU Load" from the list of installed programs

4. Click the "Add/Remove" button

5. Follow the uninstall program's directions.

Idyle Software

  Idyle Software

  5751 Sherbrooke W.

  PO Box 13

  Montreal (QC) H4A 3P4

  Canada

  http://www.idyle.com


Help with CPU Load

CPU Load window

  The CPU Load window is divided in two panels. The left panel, called "Usage" displays the current CPU usage percentage. The right panel, called "History" displays the history of CPU usage. The larger the CPU Load window is, the longer the History graph remembers.

This window may be resized, minimized or maximized using the usual Windows techniques.

  A new button is visible in the window's title bar. When this button is clicked, CPU Load's window will be minimized to the system tray (near the clock) instead the taskbar.

  A right-click on the CPU Load window will bring up the context menu. This menu is the same as the system tray icon menu. Please refer to system tray icon below for a description of the features.

System tray icon

  CPU Load will create a system tray icon in the tray notification area (near the clock in the taskbar). A right-click on this icon will bring up CPU Load's menu.

The menu's features are:

  - Always on top : will make the CPU Load window be on top of all other windows.

  - Start CPU Load when you log on : will automatically run CPU Load whenever you log-on your computer.

  - Show CPU Load window : will show and restore the CPU Load window.

  - Hide CPU Load window : will hide the CPU Load window and minimize it to the system tray.

  - About CPU Load : will show the about box of the software.

  - Help : will bring up the help file.

  - Exit : will close CPU Load and hide the tray icon.


About CPU Load

Visit Idyle Software on the Internet at http://www.idyle.com

Copyright (c) 1999 by Idyle Software. All rights reserved.

____________________________

Idyle Software

5751 Sherbrooke W.

PO Box 13

Montreal (QC) H4A 3P4

Canada

http://www.idyle.com


License Agreement

Idyle Software

End User License Agreement (EULA)

THIS IS A LEGAL AGREEMENT BETWEEN YOU, THE END USER, AND IDYLE SOFTWARE ENR. ("IDYLE SOFTWARE").  PLEASE READ THIS LICENSE AGREEMENT CAREFULLY BEFORE INSTALLING THIS SOFTWARE.    IDYLE SOFTWARE IS WILLING TO LICENSE THE SOFTWARE TO YOU ONLY UPON THE CONDITION THAT YOU ACCEPT ALL OF THE TERMS CONTAINED IN THIS LICENSE AGREEMENT. IF YOU DO NOT AGREE TO THE TERMS AND CONDITIONS OF THIS AGREEMENT, DO NOT INSTALL OR USE THE SOFTWARE.

The enclosed computer program, referred to hereafter as the "Software", is licensed, not sold, to you by Idyle Software for use only under the terms of this End-User License.  Idyle Software reserves all rights not expressly granted to you. You retain ownership of the media on which the Software is stored, however Idyle Software retains ownership of the Software itself.

1. End-User License

This License allows you to use the software on one or more computer. To "use" the Software means that the Software is either loaded in the temporary memory (i.e. RAM) of a computer or installed on the permanent memory of a computer (i.e. Hard disk, etc.) You may also install the Software on a common storage device which is accessible by multiple computers.

You may make a single copy of the Software in machine readable form solely for backup purposes. As an express condition of this End-User License, you must reproduce on each copy any copyright notice or other proprietary notice that is on the original copy supplied by Idyle Software.

This software is marked as "FREEWARE" by Idyle Software and no licensing fee are required in order to "use" the software.

2. Restrictions

You may not REVERSE ENGINEER, DECOMPILE, DISASSEMBLE OR OTHERWISE REDUCE THE SOFTWARE TO ANY HUMAN PERCEIVABLE FORM. YOU MAY NOT MODIFY, ADAPT, TRANSLATE, RENT, LEASE, LOAN OR CREATE DERIVATIVE WORKS BASED UPON THE SOFTWARE OR ANY PART THEREOF.

3. Termination

This End-User License agreement is effective until terminated. You may terminate this End-User License agreement at any time by destroying all copies of the software and related materials.  Idyle Software may terminate this license without notice to you if you fail to comply with any of its terms.  Any such termination by Licensor shall be in addition to and without prejudice to such rights and remedies as may be available, including injunction and other equitable remedied.  Upon receipt by you of a written notice of termination from the licensor or termination by you, you shall immediately (a) cease using the software, and (b) within five days thereafter, provide the licensor with a written confirmation that you have complied with the foregoing.  The provisions of sections 2,3,4 and 5 herein shall survive termination of this End-User License Agreement.

4. Limitation of Warranty and Limitation of Liability

  THE PROGRAM IS PROVIDED TO YOU "AS IS," WITHOUT WARRANTY.

THERE IS NO WARRANTY FOR THE PROGRAM, EITHER EXPRESSED OR

IMPLIED, INCLUDING, BUT NOT LIMITED TO, THE IMPLIED WARRANTIES

OF MERCHANTABILITY AND FITNESS FOR A PARTICULAR PURPOSE AND

NONINFRINGEMENT OF THIRD PARTY RIGHTS.  THE ENTIRE RISK AS TO

THE QUALITY AND PERFORMANCE OF THE PROGRAM IS WITH YOU.  SHOULD

THE PROGRAM PROVE DEFECTIVE, YOU ASSUME THE COST OF ALL NECESSARY

SERVICING, REPAIR OR CORRECTION.

IN NO EVENT UNLESS REQUIRED BY APPLICABLE LAW OR AGREED TO IN

WRITING WILL I, OR ANY OTHER PARTY WHO MAY MODIFY AND/OR

REDISTRIBUTE THE PROGRAM AS PERMITTED ABOVE, BE LIABLE TO YOU FOR

DAMAGES, INCLUDING ANY GENERAL, SPECIAL, INCIDENTAL OR CONSEQUENTIAL

DAMAGES ARISING OUT OF THE USE OR INABILITY TO USE THE PROGRAM

(INCLUDING BUT NOT LIMITED TO LOSS OF DATA OR DATA BEING RENDERED

INACCURATE OR LOSSES SUSTAINED BY YOU OR THIRD PARTIES OR A FAILURE

OF THE PROGRAM TO OPERATE WITH ANY OTHER PROGRAMS), EVEN IF SUCH

HOLDER OR OTHER PARTY HAS BEEN ADVISED OF THE POSSIBILITY OF

SUCH DAMAGES.

5. General

This End-User License Agreement supercedes all prior or collateral oral or written representations or agreements related to your right to use the software.  This End-User License will be construed under the laws of the province of Quebec, Canada. If any provision of this End-User License shall be held by a court of competent jurisdiction to be contrary to law, that provision will be enforced to the maximum extent permissible, and the remaining provisions of this End-User License will remain in full force and effect.

Les parties ont convenu que cette convention soit rédigée en anglais.

The parties have agreed that this agreement be drafted in English.

---------------------------------

Idyle Software

5751 Sherbrooke W.

PO Box 13

Montreal (QC) H4A 3P4

Canada