[entry]
Entry_Name=metronet

[Phone]
Phone_Number=Einwahl-Nr. (s. metronet-Hilfe)
Area_Code=x
Country_Code=43
Country_ID=43
Dial_As_Is=No

[Server]
Type=PPP
SW_Compress=Yes
Negotiate_TCP/IP=Yes

[TCP/IP]
Specify_IP_Address=No
Specify_Server_Address=Yes
DNS_Address=192.168.100.1
Gateway_On_Remote=Yes

[User]
Name=Ihr Benutzername
Password=
Display_Password=No

[URL]
Home_page=http://www.metronet.de/

[Internet_Mail]
Email_address=@metronet.de
POP_Server=pop-mail.metronet.de
SMTP_Server=pop-mail.metronet.de
Install_Mail=1

[Internet_News]
NNTP_Server=pop-news.metronet.de
Install_News=1
Logon_Required=0

[proxy]
Proxy_Server=192.168.100.3:80
Proxy_override=<local>

