Click here to view the list of messages in the log.


Click here to minimize the application on the system tray.


Click here to close the application.


Click here to view the selected newslet.


Click here to delete the selected newslet.


Click here to close the dialog.


Loads Quick Heal Messenger at startup.


Check this if you want Quick Heal Messenger to play sounds depending on the message catagories.


Click here to configure Messenger settings.


General Settings

Use this tab to configure Quick Heal Messenger to load automatically at system boot. You can also configure the frequency at which to check for new alerts and messages.


Sound Settings

Use this tab to configure Quick Heal Messenger sound settings. You can specify different wave files for different activities. You can configure to disable the sound for any particular or all activities.


Enable Live Update Scheduling to update Quick Heal automatically.


Update Quick Heal daily.


Update Quick Heal once a week.


Update Quick Heal once in two week.


Update Quick Heal once in a month.


Always prompt before starting Quick Heal Live Update.


Update Quick Heal using the defination file from Quick Heal's  web site.


Update Quick Heal using the defination file from specified path.


Path of folder in which defination file can be located.


Load default settings.


Close this dialog box and save any changes you have made.


Close this dialog box without saving any changes you have made.