[Entry]
Entry_Name=TPG Cooktown
[Phone]
Area_Code=7
Phone_Number=4082 0900
Country_Code=61
Country_ID=61
Dial_As_Is=No
[TCP/IP]
Specify_Server_Address=No
DNS_Address=203.12.160.35
DNS_Alt_Address=203.12.160.36
IP_Header_Compress=Yes
Gateway_On_Remote=Yes
[User]
Requires_Logon=No
[Server]
Negotiate_TCP/IP=Yes
Disable_LCP=No
PW_Encrypt=No
SW_Compress=Yes
Type=PPP
[ApplyInsSec]
DontApplyIns=1
[Branding]
NoClear=1
