
UNLOCK:   HI command
          Enables users whose terminals have been locked out of
          the system to log back on; cannot be used for virtual
          terminals.

          SYNTAX:
          unlock [terminal-id-list|*]

          PARAMETERS:

          terminal-id-list
                    One or more physical device names of the terminals to
                    be unlocked.  Multiple names must be separated with
                    commas.

          *         All configured terminals are to be unlocked.

          ADDITIONAL INFORMATION:

          The unlock command can be used only by the Super user.  It
          unlocks terminals that were locked out by either the lock
          or shutdown commands.  When you invoke unlock, the HI
          initiates logon procedures for terminals where the user is
          logged off.

          When a terminal is unlocked, the following message is displayed
          on the terminal where unlock is invoked:

             unlocked
             terminal-id>, unlocked

          This message is displayed on the unlocked terminal:

             Terminal is now unlocked and available for use.

          For further information on this command, please refer to the
          Command Reference manual.
