                             WORKSTATION SETUP

This portion of the program is used to configure the workstation environment
so that the PADS Program can be operated on a network.

NOTE: You should take the time to read the Network Appendix of the Reference
Manual before attempting to install a PADS Program on a network.

 YOU MUST INSTALL THE PADS PROGRAMS ONTO THE NETWORK FILE SERVER BEFORE YOU
 CAN PERFORM A WORKSTATION SETUP. IF YOU HAVE NOT ALREADY DONE SO, EXIT BACK
 TO THE MAIN MENU AND USE THE SOFTWARE INSTALLATION OPTION TO INSTALL THE
 SOFTWARE ONTO THE NETWORK FILE SERVER BEFORE CONTINUING WITH THE WORK-
 STATION SETUP.

To select the PADS Program from the window, use the up and down arrow keys
on the key pad to highlight the desired program, then press F1 to continue.
In the windows that follow there will be separate setup instructions for
each of the PADS Programs.

The first window will describe the minimum requirements for operating the
PADS Program on a network.  Before operating the program on a network the
workstation must meet these minimum requirements. You will then be prompted
for the disk drive where DOS is presently installed.

The next window will describe how to enter the path to the workstation's
PADS Utility Directory. You will be required to enter the path and the drive
letter of the server.  A confirmation of your selections will be required
before continuing with the WORKSTATION SETUP.

The next few windows will prompt you to load the PADS Program files,
training files, and library files onto the workstation.

The next window will describe the modification required to the workstation's
AUTOEXEC.BAT file to set the proper search path to the PADS Program on the
network.

After you have completed the WORKSTATION SETUP, it will be necessary to
perform a HARDWARE SETUP for each of the PADS Programs that will be operated
from the workstation.

