
 Every workstation requires a SET PPCB statement in its AUTOEXEC.BAT file. 
 The SET PPCB statement will cause the redirection of the PADS Program to 
 the  workstation's  directories  so that it will read/write PADS program 
 files and libraries from these directories.

 The following statements will be added to the AUTOEXEC.BAT file of the
 workstation for all PADS Programs except LOGIC:

      SET PPCB = cpath;cpath\FILES;cpath\CAM;PCB;

 For LOGIC:

      SET PLOGIC = cpath;cpath\LOGFIL;cpath\CAM;CAE;

 Where cpath = Client path as previously entered.



