MOVE allows you to place a viewport anywhere within the
Drawing Area.

Indicate the viewport you want to move.

When you move the cursor, an outline of the selected
viewport is displayed. Use the outline as a guide because
overlapping viewports are NOT allowed. Move the outline of
the viewport to the desired area of the Drawing Area and
indicate a new position. The viewport is placed in a new
location.
