SHRT RD allows you to create radius or diameter dimensions
with shortened solid leader lines. To use this option, you
MUST use SET, LDR, SOLID and SET, STANDRD, DIM ALN to YES
before doing the dimensioning.

Indicate whether or not you want to use shorten
radius/diameter dimension leader lines by choosing from
the following options:

NO  - to return to the previous menu with the standard
      radius and diameter functions in effect.

YES - to indicate that you want to create radius or 
      diameter dimensions with shortened solid leader 
      lines.

Dimension the radius or diameter of the desired entity.

Select the arc to be dimensioned; this is the position 
that the leader line will extend to from the dimension
text.

Indicate the position of the dimension text. The text is
positioned as indicated with the leader line extending 
from under the dimension text to the edge of the entity.
