ANGLE aligns an instance by letting you select the 
alignment point, the instance to align, the location to
which you want to align the instance, and the angle of the
tracking line.

Select an alignment point using an option from the
Position Menu. CADKEY uses this point to determine the
tracking path.

Cursor select the instance you want to align with the 
point; CADKEY surrounds the active instance with a dashed,
highlighted box.

Select the point to align the instance with using an 
option from the Position Menu.

Enter the angle of the tracking path in degrees. CADKEY
creates an angular tracking path along which you can 
cursor select a new alignment position.

Select a new alignment position for the instance along the
tracking path using an option from the Position Menu.
