LOCATE changes the location of an instance in the
drawing layout. 

The active instance is surrounded by a ghost box that you
can move around the Drawing Window.

Select a new position for the drawing instance using an
option from the Position Menu.

CADKEY repositions the drawing instance. 

In DLM, when you change the location of an instance that
has crosshatching or a dimension tagged to it, the 
dimension or cross-hatching pattern moves accordingly. 

Press (F10) to return to the MODIFY menu.
