 UWFLT                                                      Menu: (MWALS) MWEDT
 ==============================================================================
 To update the radius of a multi-layer wall fillet.

         1.   (NUM) NEW radius of fillet (greater than 0)
         2. * (IND) first wall of the fillet
         3. * (Y/N) confirm choice
         4. * (IND) second wall of the fillet
         5. * (Y/N) confirm choice
         6. * (IND) fillet to be updated
         7. * (Y/N) confirm choice

 Description:
 This command changes the radius of an existing multi-layer wall fillet. The
 adjoining walls are adjusted according to the new arc.
 Specify the new arc radius. Indicate and confirm the two straight walls
 between which the arc is drawn. Indicate and confirm the arc to be updated.
 The arc is adjusted together with the adjoining walls. If the 3-dimensional
 projection of the fillet already exists, this command will cause it to
 disappear. It may be recreated using the \mw3d or \wal3d commands.
