 UWASG                                                      Menu: (MWALS) MWUTL
 ==============================================================================
 Updates the number of straight segments in a 3D multi-layer wall arc.

         1. (IND) wall to update no. of 3D segments
         2. (Y/N) confirm choice
         3. (NUM) number of segments for 3D display of arcs (3-25) <10>

 Description:
 Any 3D multi-layer wall arc consists of a number of straight segments. The
 greater the number of segments the smoother the curve. The default is 10
 segments. If openings exist within the arc, the number of segments may be
 adjusted by the system to accommodate the opening.
 Indicate and confirm the wall to be updated. State the number of segments in
 the arc (3 to 25).
 If you use this command on a 2D multi-layer wall arc, the system will produce
 the 3D model of the wall. This may save you using the \mw3d or \wal3d
 commands.
 This command does not affect the 2D wall.
