UTSIZ                                                               Menu: MTEXT
===============================================================================
Updates the text size.

         1.  (Y/N) options: y-scale during placing, n-fixed size <current: y>
         2.  (NUM) new text size (greater than 0)
         3.  (Y/N) update text: y-selection group, n-single entity
      if reply is `n':
         4.* (IND) text to update
         5.* (Y/N) confirm choice

Description

This command updates the size of texts.

Specify whether the text size is to be scaled or fixed during placing. If it
is scaled (default), the size of the text is scaled according to the drawing.
If it is fixed it will remain at the specified size, irrespective of the scale.
Specify the new text size (in m if the current units are meters, or in the
format chosen for feet units).

Specify whether you wish to update a selection group (`y'), or a single text
entity (`n'). If the reply is `y' the selection group is updated and the
update may be seen after de-selecting the group. If the reply is `n' indicate
and confirm the text to update.

The system will ask you for further texts to update until you select
another command.
