UALGN                                                       Menu: (MWALS) MWEDT
===============================================================================
Updates the position of the alignment of multi-layer walls.

         1.      (Y/N) options: y-single wall, n-selection group, <ENTER>-all
         2.      (CHAR) NEW alignm.: 1-1st layer, 2-center, 3-last layer,
                                                           4-opposite, 5-axis
      if option `i' is selected:
         3.*     (IND) wall to update alignment
         4.*     (Y/N) confirm choice

Description
This command updates the position of the multi-layer wall alignment after the
wall has been created. It changes the position of the alignment within the
wall without moving the wall.

This command may be executed on a single wall, a selected group of walls or
on all multi-layer walls in a single operation.

Specify the new alignment position. The options are as follows: 1-first layer
of the wall; 2-center of the wall; 3-last layer of the wall 4-opposite
(i.e., if the alignment is currently aligned with the first layer of the wall
it will be realigned to the last layer. If it is currently aligned on the
center, no change will be made).

If you are changing the alignment of a single wall, indicate the wall and
confirm its choice. You are prompted to indicate another wall to update until
you enter another command.
