 TOL                                                                Menu:STTUS
 =============================================================================
 Sets the tolerance for solid calculations.

       1.  (NUM) solid tolerance (range in current unit)

 Description:

 This command sets the accuracy tolerance for various calculations.

 Enter a value for solid tolerance. The range, displayed in the current
 unit, is 0.00001-0.1 meters.

 This value sets the tolerance accuracy for various calculations and
 represents the length of an entity line which will be effective in
 the system operations. Lengths shorter than this value will be ignored,
 e.g., in operations like union, subtraction, hidden lines removal, etc.
 Unexpected results may occur if entities requiring fine tolerances
 are included in files containing many large entities (requiring larger
 tolerances) and vice versa.

 When entering \tol, the current tolerance is displayed on the INPUT line.

