 SVIEW                                                               Menu: VIEW
 ==============================================================================
 Saves the current view under a specified name.
 (A nested command.)

         1. (CHAR) name of view to keep (1 - 7 char.)
         2. (Y/N) wish to save views on file? <y>
      if reply is 'y'
         3. (CHAR) name of file in which to save views (1-7 char.)

 Description:
 This command may save up to ten different views of your geometric model during
 the working session, and store them in a file for use in future work sessions.
 State the name (up to seven characters) under which the current view is to be
 saved. The system asks you if you wish to save the views on file enabling you
 to recall them in subsequent work sessions. If you wish to do so the system
 will ask you for the file name in which the views saved during the current
 work session, will be stored.
 To load a previously-saved view, use the \lview command.
