 SUNPT                                                              Menu:SOLID
 =============================================================================
 Sets a new sun position for use in shadow projections
 (option `d' of \dsmod)
 (Applicable in solid module only.)

    1. (POINT) new sun location (z greater than 0) <current location>

 Description:

 This command sets the position of the sun (or parallel light source)
 for shadow calculations. Specify a position along the x y and z axes.
 The sun is located along a line that connects this point to the origin
 (0 0 0). The default is the current position.

 The model will be drawn according to the new sight cone in the current
 display mode.

