SLOAD                                                              Menu: SOLID
==============================================================================
Loads an existing solid model file to be the current one.
(Applicable to solid mode only.)

        1. (CHAR) solid file name to load (1-7 char.)
        2. (Y/N) display solid with the saved view <y> (n-current view)
     following the solid processing you are prompted for a display mode:
        3. (CHAR) mode: w-wire,h-hidden,a-dashed,s-surfaces,d-shadows,o-off
           (See command \dsmod for further prompts and options.)

Description:
This command loads an existing solid model. You are asked to define the
display mode.
You have the option to display the model in the same orientation in which it
was saved, or in the current view.
