SETMW                                                              Menu: MWALS
==============================================================================
Sets the current multi-layer wall type.

         1. (CHAR) wall name (ln-xxxxx, 1-8 chars.), <ENTER> for graphic lib.
         2. (NUM) height of wall (0 or greater)

Description
This command sets the current multi-layer wall type from the library of
predefined wall types.  You must set the wall type before creating a
multi-layer wall.

You may either specify the name of the wall or select it from the pull-down
graphic library.

If you want to specify the wall by name, enter the name of the wall.

If you want to select the current multi-layer wall type from the pull-down
graphic library, press <ENTER>.  Select any of the displayed walls by moving
the cursor over the desired wall and pressing left mouse button (B1).  If you
wish to see the wall in more detail, press the right mouse button (B2) to zoom
in.  Cancel the zoom by pressing any button.

Specify the height of the wall.  The default value is zero, which you may use
if you do not require a 3D model at this stage.

The defined wall becomes the default wall for the work session until another
wall type is specified.  A new height may be set for the wall using the \mwalz
command or updated using the \uwalz command.  A wall is created using the
\mwall command.

Wall types may be taken from the predefined set of walls provided with the
system or may be created using the \wlib command.

You may now continue to define the points for the creation of a wall (see
\mwall).
