RSLIB                                                   Menu: Non-menu command
==============================================================================
Restores your original working file if the system fails to do so (while
editing libraries).

Description

This command is only to be used if the system has failed to restore your
original file correctly.

When using one of the commands \wlib, \tlib, \olib, \elib or \clib, the
system creates a temporary file called $n$LIB (n = W ,T ,O E or C respectively).
This file displays the current library you are working on, (see the relevant
documentation on the above commands). If the system fails to restore the
original view after invoking one of the above commands, use this command to
restore it. This would be necessary if, for example, you use a command that
is not nested while in the middle of one of the above commands.
