RESTR                                                               Menu: SCRN
==============================================================================
Restores the original screen color table and background color.
(Applicable in both geometric and solid modules.)

\restr

Description

This command restores the original screen color table (as defined in
DEFINE.TBL, see Appendix A.4), and the screen default background (color 0).
It is especially useful when quitting shade or shadows in the \solid command,
which leaves the screen controlled by a temporary color table and background
color.
