RESTC                                                   Menu: Non-menu command
==============================================================================
Restores all entities stored in the \ARCALIB\CACHE sub-directory back to the
\ARCALIB directory.

         1. (Y/N) restore all placed files from \arcalib\cache to
                                                            \arcalib? <y>

Description
When installing the system a subdirectory \CACHE is created in the \ARCALIB
directory.  When placing a 3D library entity or a placed entity, the entity is
moved by the system to this subdirectory in order to enhance the speed of
operation.  If you load a file containing such entities, these will also be
moved to \ARCALIB\CACHE.

The entities are returned to \ARCALIB at the end of the work session or by
using this command.

If you search for such objects during the session using \shell, look for them
in the \ARCALIB\CACHE subdirectory.  If your system crashed due to a power
failure or other reason the entities may have remained in this subdirectory
and, if so, can be recovered from there.
