PL1P                                                               Menu: PLACE
==============================================================================
Places an external object in the model with a specified scale and position.

        1.   (CHAR) file name to place (1-8 char.)
        2.   (NUM) 3 scaling factors (x,y,z)
        3.*  (POINT) positioning point (press <ENTER> for NEW factors)

Description:
This command places an external object at a given positioning point in the
model, with the same orientation as in the original object. Enter the file
name of the object you want to place (up to 8 characters). Enter the scale
(giving 3 factors by which the x, y, and z coordinates of the original are to
be multiplied respectively). If you have made a mistake and want to set new
scaling factors, press <ENTER>, otherwise pick the positioning point. The
object is placed so that its origin (0 0 0) coincides with this positioning
point.
This object is treated as one entity, and it may only be modified in its
original file.
You are prompted to position additional objects, with the same scale or with
a new scale (by pressing <ENTER>) in other locations, until you enter a new
command.
If the file is empty or the file name does not exist in both your directory
and ARCALIB, you will be notified. You may specify another file name, and all
other parameters will remain unchanged.

        Example: \pl1p box 1 2 3 10 10 0

Result: The external object called "box" is placed in the model. The origin
point of "box" is positioned at 1010 0 of the active model. The coordinates of
"box" are multiplied as follows: x by 1, y by 2, z by 3.
