PATH                                                                Menu: INFO
==============================================================================
Toggles the display of the current path on screen.

         1. (Y/N) set path: y-on, n-off

Description

This command enables you to toggle the display of the current DOS path.

The current path will be displayed in the upper-left graphic zone
of the screen, besides the file name, e.g., D:\TEST\NEW.

The default is to display the current DOS path. Enter `n' to turn
the display of the path off. Enter `y' to display the path.
