PAN                                                                 Menu: VIEW
==============================================================================
Shifts the view by panning from one point to another repetitively.
(A loop nested command.)

         1.  (POINT) from point
         2.* (POINT) to point, <ENTER> to exit command

Description

This command shifts the view across the screen.

Pick two points. The system shifts the view on screen by a distance equal to
the displacement between the two points so that the first point occupies the
location of the second point.

You are prompted for further "to" points until you press <ENTER> to return to
the previous command or select a new command.

NOTE: You may shift the view an entire screen left, right, up or down using
Alt + a grey arrow key (if you have an extended keyboard) or using the \panw
command.

Example:         \pan  0 0 0 1 2 0
Result: The display is shifted by 1 unit on the x axis and 2 units on the y axis.
