OREPL                                                              Menu: MWEDT
==============================================================================
Replaces openings in multi-layer walls.

         1. (CHAR) replace by: i-ind., c-curr., s-sel.gr., a-sample,
                                                           n-name, <ENT>-lib.
      if `i' is selected:
         2.*(NUM) opening to replace
         3.*(Y/N) confirm choice
      if `a' is selected:
         2. (IND) sample opening
         3. (Y/N) confirm choice
      if `n' is selected:
         2. (CHAR) opening name (up to 8 chars)
      for all options:
         4. (NUM) replace option: 1- 2D symbol, 2- 3D obj., 3- both
      if `2' is selected:
         5. (CHAR) 3D obj. name, <ENTER>-system rectangle default
      for all options:
         6. (NUM) replace to: i-ind., c-curr., n-name, <ENTER>-graphic lib.
      if `i' is selected in prompt 6:
         7.*(IND) replacing opening
         8.*(Y/N) confirm choice
      if `n' is selected in prompt 6:
         7. (CHAR) opening name (up to 8 chars.)
      for all options:
         9. (Y/N) keep the result ?

Description

This command replaces openings in multi-layer walls.

Use this command if you have replaced multi-layer walls (using the \wrepl,
\uaxis or \uwofs commands) or if you decide to change the existing openings in
your multi-layer walls.

Specify the method by which the opening(s) to be replaced will be selected.
This may be done by:
          indicating an individual opening
          all openings the same as current default opening
          selected group
          indicating a sample opening
          specifying an opening by name

If you selected in prompt 1:
`i-ind', select and confirm the opening to be replaced.
`a-sample', select and confirm the sample opening to be replaced.
`n-name', enter the name of the opening(s) to be replaced.

The current default opening for the wall is set using the \clib command.
Option `e' (in the \clib command) will enable you to view the current default
of the opening/end condition combination library.  Note that the default
opening must be set to the correct opening direction and orientation.  If the
required combination does not exist or exists in the wrong orientation, create
the opening combination as required and set it to be the default.

Specify the type of opening to replace the selected openings.  If you select
3D openings, specify the 3D opening name or press ENTER for the rectangular
system default.

Specify the method by which the replacing opening(s) will be selected.

If you selected in prompt 6:
`i-ind', indicate and confirm the replacing opening.
`n-name', enter the name of the replacing opening.

All the specified openings will be replaced.

Confirm if you wish to keep the result.  If you reply negatively, the original
openings will be restored.

If you selected `i-ind' in prompt 1, you will be asked to indicate further
openings to be replaced until you select a new command.
