OLIST                                                               Menu: INFO
==============================================================================
Provides information on placed entities contained in the model and other files
associated with it.

         1. (CHAR) file to list (full path up to 40 chars.)-<ENTER> for current
      following display of report:
         2. (Y/N) wish to save the report ?
      if `y' is entered:
         3. (CHAR) report name (up to 30 chars.) (if \ is needed, use / )

Description

This command searches for all the files associated with the specified file. It
first searches the current directory, then the \ARCALIB\CACHE subdirectory,
and finally the \ARCALIB directory. Files associated with the model but not
found in the search will be listed as missing.

NOTE: If you intend to transfer a file to DXF, it is recommended to check for
missing files using this command.

Specify the file name to be listed or press <ENTER> to list the current file.
Then specify whether you wish to save the report. If you reply positively,
enter a name for the file to which the report will be saved. You may specify
any valid DOS filename and extension, and you may also specify a path to any
directory or disk. Do not use \ (backslash). Use / (slash) instead.

The list appears in the following format:

File name: NEW Last save: 29.12.91 12:52
Database size: 46198 bytes

1.Placed object from current directory:

File name      Quantity           Placed
in levels

CABINET         2       2
CABINET1        5       1 2
CABINET2        6       2
FILE    7       1       1 2 3
OFFICE1         1       1

Total: 5 files occupying 50552 bytes

2.Placed files from ARCALIB:

File name      Quantity           Placed
in levels

3DCHAIR2        3       1
3DPC&DSK        2       1
3DSHELFS        3       1

Total: 3 files occupying 37230 bytes

Total of project: 9 files occupying 133980
bytes

2-D library objects:

File name      Quantity           Placed
in levels

MAN1    2       1
MAN2    3       1
TREE2E  1       1
WOMAN1  5       1

Wall types used:

L3-F28_5
L3-F31
L4-F36

Openings:

Opening name  Quantity           Placed
in levels

DOOR1   4       1
WINDOW1         7       1

Fonts used:

OUTLINE  ROMAN

Missing Placed files:

File name      Quantity           Placed
in levels
OFFICE2         1       1

In order to return to the graphic display press <ENTER>. If there are more
placed entities than can be displayed on one screen the word "***more***"
appears at the bottom of the screen. Press <ENTER> to see the next "page."

This command can be used externally, i.e., executed from the DOS prompt.
To do this, type:
         \path\olist  \path\filename  \path\reportname and press <ENTER>
where:
         \path\olist is the path to the olist.ovl file; the path is usually
                                                                    \ARCAOVL
         \path\filename is the path and name for the drawing file to be listed
         \path\reportname is the path and name for the file that will be
         generated with the olist report
