NGRID                                                               Menu: SCRN
==============================================================================
Erases the grid from the display.
(A nested command.)

Description:
This command removes the orthogonal grid (previously set by the \grid command)
from your screen. Although the grid is no longer displayed, you can "pick" the
grid points by pressing the left button (B1) on the mouse.
