NEWVS                                                               Menu: VIEW
==============================================================================
Sets a specified view and determines the scale, and location of origin.
(A nested command.)

         1. (CHAR) new view: p-plan, f-front, b-back, l-left, r-right, x-axo
         2. (CHAR) center: (c-current, n-new) OR origin: (l-lower left, m-middle) <c>
      if reply `n' to prompt 2:
         3. (POINT) new screen center point
      for all options:
         4. (NUM) new scale (0.01-100000)

Description
This command selects a new view, determines the center and location of the
origin (0 0 0) on the screen and sets a new scale, in a single operation.

Specify a new view.  Then specify if the current screen center point will
remain at the center (option `c' the default), or if you want a new screen
center point (option `n'), or you may opt to have the origin point (0 0 0)
located at the lower-left corner of the screen (option `l') or in the middle
of the screen (option `m').  If you selected option `n' you will be prompted
to indicate the current location of the new center point.

Specify the new scale.  Using METERS, the valid scales are 1:0.01 up to
1:100,000.  Using FEET, the valid scales are 10' up to 0.0012" (10.000' up to
0.0001').

Example                 \newvs x 50 d

Result:The model is displayed in axonometric view.  The display scale is 1:50
and the origin symbol (asterisk) is in the lower-left corner of the screen.
