NEWP                                                               Menu: POLYG
==============================================================================
Initiates a new polygon.

        1.   (POINT) polygon starting point
        2.   (POINT) next point of polygon
        3. * (POINT) next point of polygon
                     (press <ENTER> to close polygon)

Description:
This command initiates a new polygon, which becomes the current polygon. Since
only a single polygon can be the current polygon at one time, initiating a new
polygon automatically terminates this status for the previous polygon. Pick
the starting point of the polygon, and then each successive point. You are
prompted for additional points until you enter a new command. In order to
close the polygon, (as in \endp), press <ENTER>.
        Example: \newp 0 0 0 4 0 0 4 4 0 0 4 0 0 0 0 \p3d y 4 y
        Result: A four-sided polygon is created, starting at point 0 0 0, and
going 4 units in the x direction and 4 in the y direction. \p3d y 4 y creates
a positive solid from the polygon, 4 units high.
