MWDIM                                                                Menu: DIM
==============================================================================
Creates a dimension line along multi-layer walls, picking up the openings.

         1.  (NUM) measure: 1-wall only, 2-add open., 3-add height,
                                                            4-add sill <4>
      if `4' is selected:
         2.  (CHAR) sill level notation (up to 5 char)
      for all options:
         3.  (IND) dimension line position
         4.* (IND) wall to measure, <ENTER>-new position pt.
         5.* (Y/N) confirm choice

Description
This command creates a dimension line along multi-layer walls, picking
up the openings if desired.

Select whether to create a dimension line(s) for:

the wall only

the wall and its openings

for the wall, its openings and opening height

for the wall, its openings, opening heights and sill levels

If option 4  "add sill" is selected, up to five characters
can be given as the characters to precede the sill dimension, e.g.,
U.K. 1.10 or SILL 1.10

Indicate a position for the dimension line. Then indicate and confirm
the wall to measure or press <ENTER> if you regret the position and
wish to relocate it.

The dimension line is drawn at the selected location.

NOTE 1: For format codes 43 and 44, all the added dimension information
        (options 3 and 4) will be drawn above the line.
NOTE 2: Where one text item would be overwritten by another, the system
        will reposition the dimension texts so they do not overlap.
NOTE 3: The system will ignore the current justification and always
        assume it to be "center".

NOTE 4: The additional dimension information (options 3 and 4)
        will not be affected by \movef.
NOTE 5: This command does not operate in feet units.
