MTARG                                                              Menu:SOLID
=============================================================================
Modifies the target position by a relative displacement or relocates the
target at the center of the model.
(Applicable in solid module only.)

     1.* (CHAR) options: u-up, d-down, l-left, r-right, c-center
if `u', `d', `l', or `r' is selected
     2.* (NUM) displacement

Description:

This command changes the position of the target by specifying a displacement
relative to its current location or relocating it at the default position
the spatial center of the current model (calculated between its extreme
points).

Select the direction of the displacement (u=up, d=down, l=left, r=right,
or c=center). If you select `u', `d', `l' or `r', specify the displacement
(in the current unit). The target displacement is calculated relative
to its original position.

If you are currently in any of the display modes set by the \dsmod
command in the solid module, the screen will be redrawn in the appropriate
display mode. If you are in the solid module and the display mode
is currently "off", the new view will not be displayed until a new display
mode is specified, enabling you to execute a series of manipulations before
the screen is redrawn.

The system responds according to the currently set units.
