MOUSE                                                   Menu: Non-menu Command
==============================================================================
Re-connects the mouse to the communication device.
(Applicable in both geometric and solid modules.)

Description:
Sometimes, because of communication problems, the mouse may stop reacting.
This command tries to reconnect your mouse to the communication port while in
a work session. Try it several times. If the mouse is not reconnected, check
the mouse cables and their connection to the communication port (COM1 or
COM2). If you cannot reconnect the mouse this way, please contact your
technician.
