LVIEW                                                               Menu: VIEW
==============================================================================
Loads a specified view.
(A nested command.)

        1. (Y/N) load option: v-view, f-file of views <v>
     if reply is `v':
        2. (CHAR) view name to load (1 - 7 char.)
     if reply is `f':
        2. (CHAR) file name of views to load (1-7 char.)
        3. (CHAR) view name to load (1 - 7 char.)

Description:
This command loads one of up to ten different views of your geometric model
that were previously saved, or a file containing up to ten views that were
saved in a previous work session. The system asks whether you wish to load
a view or file of views. If you wish to load a view saved during this work
session or a view from a file that has already been loaded during this work
session select the view option. The system will ask you the name of the saved
view.
If the view was saved in a file in a previous work session and has not yet
been loaded in the current work session, select the file option. The system
will ask you the name of the file and then the name of the view.
Since saving a view saves viewing parameters only and does not affect the
database, any changes made to the model since the view was saved will be
reflected in the loaded view.
