LOAD                                                               Menu: FILES
==============================================================================
Copies a specified file into the default working file NEW.

         1. (CHAR) file name to load as NEW (1-8 char.), <ENTER>-dialog box

Description
This command copies a specified file into the default working file NEW.  This
enables you to keep the original model file unchanged (as a backup) and to
work on a copy of the file.

NOTE 1:It is recommended that you always work using this command rather than
the \open command, and that you save your modifications at regular intervals
(\save).
NOTE 2: The newly-loaded file will overwrite the current contents of the file
NEW or any other file (loaded by means of the \open command), therefore save
the current file before using the \load command.

Enter the name of the file to load or press <ENTER> to select from a list of
files in a dialog box.

If you try to load a non-existent file, you will be notified and prompted
to specify another file name to load.

If you press <ENTER>, a dialog box listing all the models in the current
directory appears:

The following buttons are available in the dialog box:
Button   Operation
OK       Load the current (highlighted) file
CANCEL   Exit the dialog box without execution
RESET    Cancel any changes and reset the initial path

To load a model into the drawing editor, place the cursor on the desired model
name and select OK, or double click on it using the mouse.  The currently
highlighted file and its directory path appear in the file line.

To display a list of files in a directory, double click on the directory name
in the model box.

To return to a higher directory level, double click on ".." in the directory
box.

Since there are eight lines in the model and directory box, if there are more
than eight items in the box the scroll bar will appear in order to scroll the
list.  To scroll by one line, click on the arrow at the top or bottom of the
scroll bar.

When using the dialog box in the DSG module only files with the prefix D$ can
be loaded.
