H2DIS                                                              Menu: HELPL
==============================================================================
Marks two points given their respective distances from two points on one of
the three axial planes.

        1.   (NUM) distance from first point
        2.   (NUM) distance from second point
        3. * (POINT) first point
        4. * (POINT) second point

Description:
This command marks two points, given their respective distances from two
points on one of the axial planes. Specify the distances of the desired points
from the first and second points, and pick the points in the same sequence.
The new points will be marked by two short intersecting help-lines.
This command operates on any one of the three axial planes while in any
orthogonal view. If you attempt to execute this command while in axonometric
view the system will prompt you:
! <ENTER> invalid view, change to orthogonal !
You will be prompted for additional pairs of points until you enter another
command.
