FRESP                                                               Menu:INFO
=============================================================================
Calculates free disk space.
(A loop nested command.)

  1.* (CHAR) disk name to check (a,b,c . . .), <ENTER> to exit command

Description:

This command calculates free disk space while in session. You are
prompted for the name of the disk to check. Type the disk name, and
the system will reply on the prompt line:
size of free space on disk N is: nnnnnnn bytes

where:   N = disk name
         nnnnnnnn = no. of bytes on disk

You may enter additional disks to check until you enter a new command
or press <ENTER> to return to the previous command.
