EXDSG                                                                Menu: DSG
==============================================================================
Exits the Drawing Sheet Generator module.

Description
This command exits the Drawing Sheet Generator module and returns
to the geometric module.

The screen background color changes and the side-bar menu changes
back to the main menu. You are returned to the file that you were
in when you entered the drawing sheet generator module and the previous
system settings and viewing parameters are restored.

NOTE: Pressing <Alt> + G will also exit the Drawing Sheet Generator
module and return to the geometric module.
