 DRSCL                                                        Menu:(DSG) DEDIT
 =============================================================================
 Changes the scale of a drawing.

      1.* (IND) frame to re-scale
      2.* (Y/N) confirm choice
      3.* (NUM) new scale (0.01-100000, curr.: curr. scale), <ENTER>-fill
          frame (Auto.)
 if a new scale is entered:
      4.* (NUM) ref pt.:1-orig.,2-frm.center,3-placed file orig., 4-free <2>
 if option 4 (free) is selected:
      5.* (POINT) point to re-scale around
 if a new scale is entered:
      6.* (Y/N) wish to keep the frame ? <y>
 for all options:
      7.* (Y/N) keep the result ?






 Description:
 This command enables you to change the scale of a drawing in a frame.

 Indicate and confirm the drawing whose scale is to be changed. The
 system presents the current scale in the command line. Specify the
 new scale. If you wish to fit the whole drawing into the frame using
 automatic scaling press <ENTER>. If the drawing was a
 clipped drawing (green frame), its status will be changed to unclipped
 (red frame).

 When you change the scale of the drawing, the drawing "shifts" due to its
 changed size. In order to control this "shifting", you are prompted
 to specify a point that will remain fixed in its location while the scale is
 changed around it. You may select one of the following options:

 - origin of the frame (six points, see commands \dpscl and \dcscl)
 - center point of the frame
 - origin of placed file
 - a user defined point



 If you select the last option, specify a point.

 State whether you wish to keep the frame. If you reply `y' the size
 of the frame will remain fixed (relative to the drawing sheet) and
 the drawing will be reclipped to fit the frame. If you reply `n' the
 frame will shrink or grow according to the clipped drawing and no
 more or less of the drawing will be seen.

 You will be asked if you wish to keep the result. If you reply `n'
 the previous scale size will be restored.

 NOTE: You must reply to this prompt. If you do not your file may be damaged.

 You may indicate further drawings for rescaling until you select another
 command.

 NOTE:When indicating a drawing you may indicate either the frame itself
 or its contents but indicating the frame will save time.

