 DPSIZ                                                                Menu:DSG
 =============================================================================
 Sets or changes the size of a drawing sheet.

 if units are metric:
        1. (NUM) set plotting area, in millimeters (x y) [min.size:
                 10mm.] <curr. size.>
 if units are feet:
        1. (NUM) set plotting area: (x y) [min. size: "] <curr.size.>

 Description:
 This command changes the size of a drawing sheet. You may increase
 or decrease the size of the drawing sheet at any stage (even after
 placing drawings in it).
 Specify the new horizontal (x) and vertical (y) dimensions of the
 sheet. The screen is redrawn according to the new sheet dimensions.
 If you wish to use a standard A-size you may type \A0, \A1, \A2, \A3
 or \A4 as appropriate. The system will display the x and y dimensions
 of these standard sizes in the command line. Press <ENTER> to accept them.
 NOTE: The current standard A-sizes comply with the "HP Draftpro"
 specifications. They may be updated by editing the following files in the
 \ARCALIB directory on the system disk:A0.CCC, A1.CCC, A2.CCC, A3.CCC, A4.CCC.

