 DNEW                                                                 Menu:DSG
 =============================================================================
 Starts a new drawing sheet.

      1.(CHAR) set plotting area in millimeters (x y) [min.size: 10mm]
      2.(Y/N) place options: y-auto, n-scaled, <ENTER>-pop-up menu
 if `y' is entered, see \dpaut.
 if `n' is entered, see \dpsel.

 Description:
 This command starts a new drawing sheet.
 Specify the paper size by its x and y dimensions in millimeters (or feet).
 If you wish to use a standard A-size you may type \A0, \A1, \A2, \A3
 or \A4 as appropriate. The system will display the x and y dimensions
 of these standard sizes in the command line. Press <ENTER> to accept them.
 A white broken rectangle of the specified size is drawn to fill the screen.
 You may continue to place drawings on the sheet using automatic or
 fixed scaling (see \dpaut or \dpscl).
 Press <ENTER> to activate the pull-down menu.
 NOTE: The current standard A-sizes comply with the "HP Draftpro"
 specifications. They may be updated by editing the following files in the
 \ARCALIB directory on the system disk:A0.CCC,A1.CCC,A2.CCC,A3.CCC,A4.CCC.

