DLOAD                                                                Menu:DSG
=============================================================================
Loads an existing drawing sheet.

    1. (CHAR) dsg file name to load (1-6 char. [D$xxxxxx])
    2. (NUM) PLACE (1-auto,2-scale), CLIP (3-auto,4-scale) <ENT>-POP

See individual commands for the prompts that follow:
1. \dpaut2. \dpscl3. \cpaut4. \cpscl

Description:
This command loads an existing drawing sheet.
Specify the name of the drawing sheet to be loaded (up to 6 characters).  The
system automatically inserts D$ as the first two characters of the file name.
The file is loaded into D$NEW.

You may continue to place and/or clip drawings on the sheet by automatic or
fixed scaling.  See placing options: \dpaut (1), \dpscl (2), \dcaut (3), or
\dcscl (4).
Press <ENTER> to activate the pull-down menu.  You may regret any changes you
have made by reloading the file without saving the changes.
