DIMH                                                                 Menu: DIM
==============================================================================
Creates a horizontal dimension line.

        1.   (POINT) location of dimension line
        2. * (POINT) first point
        3. * (POINT) next point
             (press <ENTER >for another first point)

Description:
This command creates a horizontal dimension line. You are prompted for a point
through which the dimension line will pass, and then for the two points to be
dimensioned.
You are prompted for additional next points until you enter another command.
This enables you to create a continuous sequence of dimension lines.
If you wish to "skip" to a new point on the dimension line that will not be
connected to the previous point, but will still be aligned to the specified
dimension line location, press <ENTER>.
The system will then ask you for a new first point.
