CWALL                                                              Menu: WEDIT
==============================================================================
Closes specified wall end edges.

        1. * (IND) wall base to close
        2. * (Y/N) confirm choice
        3. * (POINT) side of wall to close

Description:
This command closes each open wall end edge that occurs when one wall is not
joined to another wall.
You may use this command only on a three-dimensional wall. To close one side
of the wall, use this command twice: indicate the lower base of the wall in
the first operation, and indicate the upper base in the second. Use this
command only in axonometric views (where you can clearly distinguish between
the bottom and top bases of walls).
Note that you must indicate the lower base, not only one of its lines. Only
when the lines on both sides of the axis are identified will you be able to
close the lower base. Indicate (and confirm) the wall base to close. Snap to
a point near the end you want to close and a line closing the base appears.
You are prompted to close additional walls until you enter a new command.
