COLOR                                                               Menu: SCRN
==============================================================================
Determines the background color of your display with a three number mix.
(Applicable in both geometric and solid modules.)

         1. (CHAR) backgr. color: g-Geom, s-Solid, d-D.S.G., a-All, c-Curr.,
         <Ent>-d.box
      if you enter `g':
         2. (NUM) GEOM. background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         3. (Y/N) confirm
      if you enter `s':
         2. (NUM) SOLID background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         3. (Y/N) confirm
      if you enter `d':
         2. (NUM) D.S.G. background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         3. (Y/N) confirm
      if you enter `a':
         2. (NUM) GEOM. background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         3. (Y/N) confirm
         3. (NUM) SOLID background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         4. (Y/N) confirm
         5. (NUM) D.S.G. background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         6. (Y/N) confirm
      if you enter `c':
         2. (NUM) current background: Red, Green, Blue mix, three numbers
                                                                    (0-1000)
         3. (Y/N) confirm

Description
This command determines the background color of the display in each mode of
operation.

Specify whether you want to change the background color for the geometric,
solid or Drawing Sheet Generator module, for all modules, or just for the
module you are currently working in.  If you enter `g', `s', or `d', you are
prompted to enter three numbers indicating the relative amount of red, green
and blue in the mix for the background color for the selected module.  Confirm
the color for each.

If you enter `a' for all modules, you are prompted, one by one, to enter three
numbers indicating the relative amount of red, green and blue in the mix for
each module.  Confirm the color.

If you enter `c', you are prompted to enter three numbers indicating the
relative amount of red, green and blue in the mix for the background color for
the module you are currently working in.  Confirm the color.

The background color will be modified accordingly.

The numbers must be in the range of 0-1000.

To dynamically change the mix using a dialog box, press <ENTER>.

When working dynamically with a dialog box, select the color to be changed
from the color map.  The color selected appears as the current color number
and the current sample color changes to that color.  Change the hue values
numerically using the keyboard or use the scroll bar by:

*  pressing B1 on the relevant arrow to change the value in increments of 10
*  pressing B1 on the scroll bar to move the button to that position on the
   scroll bar
*  pressing B1 on the scroll bar button and holding the mouse button down
   while dragging the scroll bar button up or down

A number set of 0 0 0 gives a black background, and 1000 0 0 is red (1000 out
of 1000 red, 0 out of 1000 green, and 0 out of 1000 blue).

The actual colors depend on your graphic board and display.

The following buttons are available in the dialog box:
Button   Operation
OK       accepts the selected color mix and saves the color table for the
         current work session only.
SAVE     accepts the selected color mix and saves the color table in the
         define.tbl. This color table will be used until a new color table
         is saved.
CANCEL   exits the dialog box without saving changes.
RESET    cancels any changes and resets the initial color table.
