CHAA                                                               Menu: WEDIT
==============================================================================
Modifies a specified wall-arc to the active width and height.

        1. * (IND) axis of arc to modify
        2. * (Y/N) confirm choice

Description:
Indicate (and confirm) the wall-arc axis that is to assume the active wall
width and height (as set by \setwz).
The two walls and the wall-arc involved in the operation must all appear on
screen in order to execute this command properly.
You are prompted for additional arcs to modify until you enter another
command.
