AXO                                                         Menu: SOLID / VIEW
==============================================================================
Sets the display to a predefined axonometric view.
(A nested command in the geometric module only.)
(Applicable in both geometric and solid modules.)

Description:
This command displays the model in a predefined axonometric view, giving you a
three-dimensional impression.

If you are in automatic scaling mode, the scale will automatically be adjusted
so that the entire model will be displayed (see \auto).

If you are currently in the geometric module or in any of the display modes
set by the \dsmod command in the solid module, the screen will be redrawn in
the appropriate display mode.  If you are in the solid module and the display
mode is currently "off", the axonometric view will not be displayed until a
new display mode is specified, enabling you to execute a series of
manipulations before the screen is redrawn.
