
		SCREEN LAYOUT DEFINITION
		************************

- Use PgDn to see the rest of this text.

The function keys work as follows:
	F10:	End screen definition.
	S-F10:	Re-size window.
	F3:  	Delete field under cursor.
	F4:	Define new field.
	F7:	Delete line.
	F8:	Insert blank line at cursor position.


Special keys are:
	Ins:		Change between insert and overwrite mode.
	Del:		Delete char under cursor
	Back Space:	Delete char before cursor


For cursor movement the following keys can be used:
	->		Move the cursor one character to the right.
	Ctrl ->		Move the cursor five characters to the right.
	<-		Move the cursor one character to the left.
	Ctrl <-		Move the cursor five characters to the left.
	Arrow up	Move the cursor one row up.
	PgUp		Move the cursor one page up.
	Arrow down		Move the cursor one row down.
	PgDn		Move the cursor one page down.
	Home		Move the cursor to the start of the window.
	Ctrl Pgup	Move the cursor to the start of the 
	                screen definition.
	End		Move the cursor to the end of the window.
	Ctrl Pgdn	Move the cursor to the end of the screen 
	                definition.
	Cr		Move the cursor to start of the next line
